<template>
  <view class="charts-box">
    <qiun-data-charts 
      type="radar"
      :opts="opts"
      :chartData="chartData"
    />
  </view>
</template>

<script>
export default {
  data() {
    return {
      chartData: {},
      //您可以通过修改 config-ucharts.js 文件中下标为 ['radar'] 的节点来配置全局默认参数，如都是默认参数，此处可以不传 opts 。实际应用过程中 opts 只需传入与全局默认参数中不一致的【某一个属性】即可实现同类型的图表显示不同的样式，达到页面简洁的需求。
      opts: {
        color: ["#1890FF","#91CB74","#FAC858","#EE6666","#73C0DE","#3CA272","#FC8452","#9A60B4","#ea7ccc"],
        padding: [5,5,5,5],
        dataLabel: false,
        enableScroll: false,
        legend: {
          show: true,
          position: "right",
          lineHeight: 25
        },
        extra: {
          radar: {
            gridType: "radar",
            gridColor: "#CCCCCC",
            gridCount: 3,
            opacity: 0.2,
            max: 200,
            labelShow: true,
            border: true
          }
        }
      }
    };
  },
  onReady() {
    this.getServerData();
  },
  methods: {
    getServerData() {
      //模拟从服务器获取数据时的延时
      setTimeout(() => {
        //模拟服务器返回数据，如果数据格式和标准格式不同，需自行按下面的格式拼接
        let res = {
            categories: ["维度1","维度2","维度3","维度4","维度5","维度6"],
            series: [
              {
                name: "成交量1",
                data: [90,110,165,195,187,172]
              },
              {
                name: "成交量2",
                data: [190,210,105,35,27,102]
              }
            ]
          };
        this.chartData = JSON.parse(JSON.stringify(res));
      }, 500);
    },
  }
};
</script>

<style scoped>
  /* 请根据实际需求修改父元素尺寸，组件自动识别宽高 */
  .charts-box {
    width: 100%;
    height: 300px;
  }
</style>